% Acronyms
% ========
%
% An acronym is a word formed from the initial letters in a phrase. 
%
% Acronym Definition Exapmle:
% ---------------------------
% \newacronym{gcd}{GCD}{Greatest Common Divisor}
% \newacronym{dry}{DRY}{Don't Repeat Yourself}
%
% Usage:
% ------
% You can use these three options:
% 
% \acrlong{}  
%   Displays the phrase which the acronyms stands for. Put the label of the acronym inside the braces. In the example, \acrlong{gcd} prints Greatest Common Divisor. 
%
% \acrshort{} 
%   Prints the acronym whose label is passed as parameter. For instance, \acrshort{gcd} renders as GCD. 
%
% \acrfull{ } 
%   Prints both, the acronym and its definition. In the example the output of \acrfull{dry} is Don't Repeat Yourself (DRY). 
% 
% For more information see:
% -------------------------
% * https://www.sharelatex.com/learn/Glossaries 
% * https://en.wikibooks.org/wiki/LaTeX/Glossary
%


\newacronym{vpn}{VPN}{Virtual Private Network}
\newacronym{vm}{VM}{Virtual Machine}
\newacronym{vb}{VB}{Virtual Box}
\newacronym{lts}{LTS}{Long Term Support}
\newacronym{os}{OS}{Operating System}
\newacronym{tcp}{TCP}{Transmission Control Protocol}
\newacronym{oss}{OSS}{Operating System Server}
\newacronym{osc}{OSC}{Operating System Client}
\newacronym{ip}{IP}{Internet Protocol}
\newacronym{ftp}{FTP}{File Transfer Protocol}
\newacronym{tls}{TLS}{Transport Layer Security}
\newacronym{ssl}{SSL}{Secure Socket Layers}
\newacronym{gw}{GW}{GateWay}
\newacronym{fw}{FW}{FireWall}
\newacronym{pdv}{PDV}{Packet Delay Variation}
\newacronym{aes}{AES}{Advanced Encryption Standard}
\newacronym{fskd}{FSKD}{Full-State Keyed Duplex}
\newacronym{}{}{}

