--
-- PostgreSQL database dump
--

-- Dumped from database version 17.4
-- Dumped by pg_dump version 17.4

-- Started on 2025-04-08 10:16:23

SET statement_timeout = 0;
SET lock_timeout = 0;
SET idle_in_transaction_session_timeout = 0;
SET transaction_timeout = 0;
SET client_encoding = 'UTF8';
SET standard_conforming_strings = on;
SELECT pg_catalog.set_config('search_path', '', false);
SET check_function_bodies = false;
SET xmloption = content;
SET client_min_messages = warning;
SET row_security = off;

SET default_tablespace = '';

SET default_table_access_method = heap;

--
-- TOC entry 222 (class 1259 OID 32768)
-- Name: range_data; Type: TABLE; Schema: public; Owner: postgres
--

CREATE TABLE public.range_data (
    station_id integer NOT NULL,
    temperature_min numeric,
    temperature_max numeric,
    pressure_min numeric,
    pressure_max numeric,
    humidity_min numeric,
    humidity_max numeric
);


ALTER TABLE public.range_data OWNER TO postgres;

--
-- TOC entry 221 (class 1259 OID 16479)
-- Name: weather_data; Type: TABLE; Schema: public; Owner: postgres
--

CREATE TABLE public.weather_data (
    id integer NOT NULL,
    station_id integer NOT NULL,
    temperature numeric(5,2),
    humidity numeric(5,2),
    pressure numeric(7,2),
    wind_speed numeric(5,2),
    wind_direction character varying(50),
    "timestamp" timestamp without time zone DEFAULT CURRENT_TIMESTAMP
);


ALTER TABLE public.weather_data OWNER TO postgres;

--
-- TOC entry 220 (class 1259 OID 16478)
-- Name: weather_data_id_seq; Type: SEQUENCE; Schema: public; Owner: postgres
--

CREATE SEQUENCE public.weather_data_id_seq
    AS integer
    START WITH 1
    INCREMENT BY 1
    NO MINVALUE
    NO MAXVALUE
    CACHE 1;


ALTER SEQUENCE public.weather_data_id_seq OWNER TO postgres;

--
-- TOC entry 4921 (class 0 OID 0)
-- Dependencies: 220
-- Name: weather_data_id_seq; Type: SEQUENCE OWNED BY; Schema: public; Owner: postgres
--

ALTER SEQUENCE public.weather_data_id_seq OWNED BY public.weather_data.id;


--
-- TOC entry 219 (class 1259 OID 16468)
-- Name: weather_objects; Type: TABLE; Schema: public; Owner: postgres
--

CREATE TABLE public.weather_objects (
    id integer NOT NULL,
    name character varying(500) NOT NULL,
    description text,
    type character varying(100) NOT NULL,
    location character varying(255),
    last_update timestamp without time zone DEFAULT CURRENT_TIMESTAMP,
    status character varying(50) DEFAULT 'active'::character varying,
    batterie integer,
    type_batterie character varying(50),
    CONSTRAINT weather_objects_batterie_check CHECK (((batterie >= 0) AND (batterie <= 100)))
);


ALTER TABLE public.weather_objects OWNER TO postgres;

--
-- TOC entry 217 (class 1259 OID 16466)
-- Name: weather_objects_id_seq; Type: SEQUENCE; Schema: public; Owner: postgres
--

CREATE SEQUENCE public.weather_objects_id_seq
    START WITH 1
    INCREMENT BY 1
    NO MINVALUE
    NO MAXVALUE
    CACHE 1;


ALTER SEQUENCE public.weather_objects_id_seq OWNER TO postgres;

--
-- TOC entry 218 (class 1259 OID 16467)
-- Name: weather_objects_id_seq1; Type: SEQUENCE; Schema: public; Owner: postgres
--

CREATE SEQUENCE public.weather_objects_id_seq1
    AS integer
    START WITH 1
    INCREMENT BY 1
    NO MINVALUE
    NO MAXVALUE
    CACHE 1;


ALTER SEQUENCE public.weather_objects_id_seq1 OWNER TO postgres;

--
-- TOC entry 4922 (class 0 OID 0)
-- Dependencies: 218
-- Name: weather_objects_id_seq1; Type: SEQUENCE OWNED BY; Schema: public; Owner: postgres
--

ALTER SEQUENCE public.weather_objects_id_seq1 OWNED BY public.weather_objects.id;


--
-- TOC entry 4755 (class 2604 OID 16482)
-- Name: weather_data id; Type: DEFAULT; Schema: public; Owner: postgres
--

ALTER TABLE ONLY public.weather_data ALTER COLUMN id SET DEFAULT nextval('public.weather_data_id_seq'::regclass);


--
-- TOC entry 4752 (class 2604 OID 16471)
-- Name: weather_objects id; Type: DEFAULT; Schema: public; Owner: postgres
--

ALTER TABLE ONLY public.weather_objects ALTER COLUMN id SET DEFAULT nextval('public.weather_objects_id_seq1'::regclass);


--
-- TOC entry 4915 (class 0 OID 32768)
-- Dependencies: 222
-- Data for Name: range_data; Type: TABLE DATA; Schema: public; Owner: postgres
--

COPY public.range_data (station_id, temperature_min, temperature_max, pressure_min, pressure_max, humidity_min, humidity_max) FROM stdin;
1	-33	42	980	1040	30	84
2	-15	50	980	1040	30	90
3	-15	50	980	1040	30	90
4	-15	50	980	1040	30	90
5	-15	50	980	1040	30	90
6	-15	50	980	1040	30	90
7	-15	50	980	1040	30	90
8	-15	50	980	1040	30	90
9	-15	50	980	1040	30	90
10	-15	50	980	1040	30	90
\.


--
-- TOC entry 4914 (class 0 OID 16479)
-- Dependencies: 221
-- Data for Name: weather_data; Type: TABLE DATA; Schema: public; Owner: postgres
--

COPY public.weather_data (id, station_id, temperature, humidity, pressure, wind_speed, wind_direction, "timestamp") FROM stdin;
1	1	21.50	60.20	1013.10	5.40	Nord-Ouest	2025-03-29 18:47:46.685241
2	2	22.30	55.00	1012.50	3.20	Sud-Ouest	2025-03-29 18:47:46.685241
3	3	24.10	50.00	1010.80	6.00	Est	2025-03-29 18:47:46.685241
4	1	19.80	65.40	1014.00	4.50	Ouest	2025-03-29 18:47:46.685241
5	2	20.60	59.30	1013.50	2.80	Nord	2025-03-29 18:47:46.685241
6	1	22.50	60.00	1012.50	12.30	Nord-Ouest	2025-03-29 08:00:00
7	1	23.00	65.00	1013.25	14.00	Ouest	2025-03-29 09:00:00
8	1	24.00	70.00	1014.75	15.20	Nord	2025-03-29 10:00:00
9	2	21.50	55.00	1011.30	11.00	Sud	2025-03-29 08:30:00
10	2	22.00	60.00	1012.80	13.00	Est	2025-03-29 09:30:00
11	2	23.50	63.00	1013.50	14.50	Sud-Est	2025-03-29 10:30:00
12	3	26.00	58.00	1012.90	17.00	Ouest	2025-03-29 11:00:00
13	3	27.00	60.00	1014.00	18.50	Nord-Ouest	2025-03-29 12:00:00
14	3	28.00	62.00	1015.10	16.00	Nord	2025-03-29 13:00:00
15	4	19.50	75.00	1010.00	9.50	Sud-Ouest	2025-03-29 08:00:00
16	4	20.00	80.00	1010.50	10.00	Sud	2025-03-29 09:00:00
17	4	21.50	85.00	1011.00	11.50	Est	2025-03-29 10:00:00
18	5	18.00	90.00	1010.70	8.00	Ouest	2025-03-29 08:30:00
19	5	18.50	92.00	1011.20	7.00	Nord-Ouest	2025-03-29 09:30:00
20	5	19.00	95.00	1011.80	6.50	Nord	2025-03-29 10:30:00
21	6	24.50	65.00	1013.90	13.00	Sud	2025-03-29 11:00:00
22	6	25.00	66.00	1014.20	14.50	Ouest	2025-03-29 12:00:00
23	6	26.50	68.00	1015.50	16.00	Sud-Ouest	2025-03-29 13:00:00
24	7	21.00	60.00	1012.50	11.50	Est	2025-03-29 08:00:00
25	7	22.50	62.00	1013.00	12.00	Nord-Ouest	2025-03-29 09:00:00
26	7	23.00	64.00	1013.75	13.50	Sud-Est	2025-03-29 10:00:00
27	8	25.00	58.00	1012.10	16.50	Nord	2025-03-29 08:30:00
28	8	26.00	60.00	1013.30	17.50	Ouest	2025-03-29 09:30:00
29	8	27.00	62.00	1014.50	18.00	Sud-Ouest	2025-03-29 10:30:00
30	9	22.00	67.00	1011.40	14.00	Est	2025-03-29 11:00:00
31	9	23.00	69.00	1012.60	15.00	Nord-Ouest	2025-03-29 12:00:00
32	9	24.00	72.00	1013.80	16.00	Nord	2025-03-29 13:00:00
33	10	18.00	55.00	1010.20	10.00	Ouest	2025-03-29 08:00:00
34	10	19.00	58.00	1011.00	11.50	Sud-Ouest	2025-03-29 09:00:00
35	10	20.00	60.00	1011.70	12.50	Est	2025-03-29 10:00:00
\.


--
-- TOC entry 4912 (class 0 OID 16468)
-- Dependencies: 219
-- Data for Name: weather_objects; Type: TABLE DATA; Schema: public; Owner: postgres
--

COPY public.weather_objects (id, name, description, type, location, last_update, status, batterie, type_batterie) FROM stdin;
1	Station Paris	Station météo située à Paris, France. Mesures de température, humidité, pression et vent.	station	Paris, France	2025-04-07 20:47:06.264847	active	100	solaire
9	Station Nice	Station météo située à Nice, France. Elle mesure la température, l'humidité et la pression.	station	Nice, France	2025-03-31 18:31:23.038047	active	100	solaire
2	Station Lyon	Station météo située à Lyon, France. Mesures de température, humidité, pression et vent.	station	Lyon, France	2025-03-30 12:16:00.835834	active	100	solaire
3	Station Marseille	Station météo située à Marseille, France. Mesures de température, humidité, pression et vent.	station	Marseille, France	2025-03-30 17:01:10.631653	inactive	100	solaire
4	Capteur Bordeaux	Capteur de température et d'humidité à Bordeaux.	capteur	Bordeaux, France	2025-03-30 17:53:01.42853	active	100	solaire
5	Capteur Lille	Capteur de pression atmosphérique à Lille.	capteur	Lille, France	2025-03-31 21:32:04.955306	inactive	100	solaire
6	Capteur Nantes	Capteur de vent à Nantes.	capteur	Nantes, France	2025-03-30 20:10:18.547523	active	100	solaire
7	Station Toulouse	Station météo à Toulouse mesurant la température, l'humidité, la pression et la vitesse du vent.	station	Toulouse, France	2025-04-02 15:43:34.803703	active	100	solaire
10	Capteur Paris Sud	Capteur de température et humidité à Paris Sud.	capteur	Paris, France	2025-04-02 23:09:38.725522	inactive	100	solaire
8	Capteur Grenoble	Capteur de température à Grenoble.	capteur	Grenoble, France	2025-04-04 10:40:08.247433	active	100	solaire
\.


--
-- TOC entry 4923 (class 0 OID 0)
-- Dependencies: 220
-- Name: weather_data_id_seq; Type: SEQUENCE SET; Schema: public; Owner: postgres
--

SELECT pg_catalog.setval('public.weather_data_id_seq', 35, true);


--
-- TOC entry 4924 (class 0 OID 0)
-- Dependencies: 217
-- Name: weather_objects_id_seq; Type: SEQUENCE SET; Schema: public; Owner: postgres
--

SELECT pg_catalog.setval('public.weather_objects_id_seq', 1, false);


--
-- TOC entry 4925 (class 0 OID 0)
-- Dependencies: 218
-- Name: weather_objects_id_seq1; Type: SEQUENCE SET; Schema: public; Owner: postgres
--

SELECT pg_catalog.setval('public.weather_objects_id_seq1', 17, true);


--
-- TOC entry 4763 (class 2606 OID 32774)
-- Name: range_data station_meteo_pkey; Type: CONSTRAINT; Schema: public; Owner: postgres
--

ALTER TABLE ONLY public.range_data
    ADD CONSTRAINT station_meteo_pkey PRIMARY KEY (station_id);


--
-- TOC entry 4761 (class 2606 OID 16485)
-- Name: weather_data weather_data_pkey; Type: CONSTRAINT; Schema: public; Owner: postgres
--

ALTER TABLE ONLY public.weather_data
    ADD CONSTRAINT weather_data_pkey PRIMARY KEY (id);


--
-- TOC entry 4759 (class 2606 OID 16477)
-- Name: weather_objects weather_objects_pkey; Type: CONSTRAINT; Schema: public; Owner: postgres
--

ALTER TABLE ONLY public.weather_objects
    ADD CONSTRAINT weather_objects_pkey PRIMARY KEY (id);


--
-- TOC entry 4764 (class 2606 OID 16486)
-- Name: weather_data weather_data_station_id_fkey; Type: FK CONSTRAINT; Schema: public; Owner: postgres
--

ALTER TABLE ONLY public.weather_data
    ADD CONSTRAINT weather_data_station_id_fkey FOREIGN KEY (station_id) REFERENCES public.weather_objects(id);


-- Completed on 2025-04-08 10:16:23

--
-- PostgreSQL database dump complete
--

