CREATE TABLE IF NOT EXISTS weather_log (
    id SERIAL PRIMARY KEY,
    city VARCHAR(100),
    temperature DECIMAL(5,2),
    description TEXT,
    timestamp TIMESTAMP DEFAULT CURRENT_TIMESTAMP
);

INSERT INTO weather_log (city, temperature, description)
VALUES ('London', 15.5, 'partly cloudy');

